
                TRACE Function

        The TRACE function is used track (trace) the execution of
M68332 instructions. You may use the TRACE function to trace a
predefined number of instructions without pause. You may also
choose  to trace any number of instructions with a pause after each
instruction execution.

        Immediately after invocation, the TRACE reminds your that
execution  will begin at the address contained in the PC register.
If you have  forgotten to set the PC register to the address at
which you wish to  trace instructions, exit the TRACE function and
use the REGISTER  MODIFY command to set the PC contents.

        Next, TRACE requests the number of instructions to be
executed. You may enter a number (decimal) or default the question
by  pressing the <Enter> key. If you enter a valid decimal number,
TRACE  will execute that number of instructions. After the
execution of each  instruction, all register contents are
displayed. Before the  execution of the next instruction, it is
disassembled and displayed.  If you default the question, one
instruction is executed. At that  point you must press the
<SpaceBar> to execute another or press the  <Enter> key to
terminate the TRACE function.

%END
